[#BloombergLP-bdlcc-Deque-clockType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/Deque.adoc[Deque]::clockType
:relfileprefix: ../../../
:mrdocs:

Return the system clock type used for timing `timed&ast;` operations on this object (see &lcub;Supported Clock&hyphen;Types&rcub; in the component documentation)&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;deque&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/SystemClockType/Enum.adoc[bsls::SystemClockType::Enum]
clockType() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
