[#BloombergLP-bdlcc-Deque-2constructor-027]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlcc.adoc[bdlcc]::xref:BloombergLP/bdlcc/Deque.adoc[Deque]::Deque
:relfileprefix: ../../../
:mrdocs:

Create a container of objects of (template parameter) `TYPE` containing the sequence of elements in the specified range `&lsqb;begin &period;&period; end)&rsqb;`, having no high water mark, and use the specified `clockType` to indicate the epoch used for all time intervals (see &lcub;Supported Clock&hyphen;Types&rcub; in the component documentation)&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; Note that the items in the range are treated as `const` objects, copied without being modified&period;

== Synopsis

Declared in `&lt;bdlcc&lowbar;deque&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class INPUT&lowbar;ITER&gt;
Deque(
    INPUT&lowbar;ITER begin,
    INPUT&lowbar;ITER end,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
