[#BloombergLP-bdlc-operator_not_eq-09]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlc.adoc[bdlc]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if `lhs` and `rhs` do not have the same value and `false` otherwise&period; Two iterators do not have the same value if they do not refer to the same element of the same container or if one has the end iterator value of a container and the other refers to an element (not the end) of the same container&period; The behavior is undefined unless `lhs` and `rhs` refer to the same container and are non&hyphen;singular (i&period;e&period;, are not default&hyphen;constructed or copies of singular iterators)&period;

== Synopsis

Declared in `&lt;bdlc&lowbar;indexclerk&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlc/IndexClerkIter.adoc[IndexClerkIter] const& lhs,
    xref:BloombergLP/bdlc/IndexClerkIter.adoc[IndexClerkIter] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
