[#BloombergLP-bdlbb-SimpleBlobBufferFactory-setBufferSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlbb.adoc[bdlbb]::xref:BloombergLP/bdlbb/SimpleBlobBufferFactory.adoc[SimpleBlobBufferFactory]::setBufferSize
:relfileprefix: ../../../
:mrdocs:

Set the buffer size for future buffers created by this factory to the specified `bufferSize`&period;

== Synopsis

Declared in `&lt;bdlbb&lowbar;simpleblobbufferfactory&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setBufferSize(int bufferSize);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
