[#BloombergLP-bdlb-operator_not_eq-098]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` objects do not have the same value, and `false` otherwise&period; The behaviour is undefined unless the iterators returned by the same `Tokenizer` object, or if the underlying input has been modified or destroyed since any of those objects were created&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;tokenizer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/bdlb/TokenizerIterator.adoc[TokenizerIterator] const& lhs,
    xref:BloombergLP/bdlb/TokenizerIterator.adoc[TokenizerIterator] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
