[#BloombergLP-bdlat_ValueTypeFunctions-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlat_ValueTypeFunctions.adoc[bdlat&lowbar;ValueTypeFunctions]::reset
:relfileprefix: ../../
:mrdocs:

Reset the value of the specified `object` to its default value&period;

== Synopsis

Declared in `&lt;bdlat&lowbar;valuetypefunctions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;class TYPE&gt;
void
reset(TYPE* object);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
