[#BloombergLP-balxml-MiniReader-2constructor-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/MiniReader.adoc[MiniReader]::MiniReader
:relfileprefix: ../../../
:mrdocs:

Construct a reader with the specified `bufSize` and the optionally specified `basicAllocator`&period; The instantiated `MiniReader` uses a memory buffer of `bufSize` while reading the input document&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; `bufSize` is a hint and may be modified or ignored if it is not within a &quot;sane&quot; range&period;

== Synopsis

Declared in `&lt;balxml&lowbar;minireader&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
MiniReader(
    int bufSize,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
