[#BloombergLP-balxml-Formatter-outputColumn]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/Formatter.adoc[Formatter]::outputColumn
:relfileprefix: ../../../
:mrdocs:

Return the current column position at a line where next output starts&period; This is unreliable if called after free&hyphen;lance information is written onto the stream returned by `rawOutputStream`

== Synopsis

Declared in `&lt;balxml&lowbar;formatter&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
outputColumn() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
