[#BloombergLP-balxml-Decoder-MemOutStream-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balxml.adoc[balxml]::xref:BloombergLP/balxml/Decoder.adoc[Decoder]::xref:BloombergLP/balxml/Decoder.adoc[MemOutStream]::reset
:relfileprefix: ../../../../
:mrdocs:

Reset the internal stream buffer to empty&period;

== Synopsis

Declared in `&lt;balxml&lowbar;decoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
