[#BloombergLP-balst-operator_not_eq-08d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` objects do not have the same value, and `false` otherwise&period; Two `StackTrace` objects do not have the same value if they do not have the same length, or any of their corresponding stack&hyphen;trace frames do not have the same value&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktrace&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balst/StackTrace.adoc[StackTrace] const& lhs,
    xref:BloombergLP/balst/StackTrace.adoc[StackTrace] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
