[#BloombergLP-balst-operator_not_eq-08a]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` objects do not have the same value, and `false` otherwise&period; Two `StackTraceFrame` objects do not have the same value if the corresponding values of their `address`, `libraryFileName`, `lineNumber`, `mangledSymbolName`, `offsetFromSymbol`, `sourceFileName`, or `symbolName` attributes are the not same&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame] const& lhs,
    xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
