[#BloombergLP-balst-StackTraceTestAllocator-failureHandler-02]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceTestAllocator.adoc[StackTraceTestAllocator]::failureHandler
:relfileprefix: ../../../
:mrdocs:

Return a reference to the function that will be called when a failure is observed&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktracetestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balst/StackTraceTestAllocator/FailureHandler-06.adoc[StackTraceTestAllocator::FailureHandler] const&
failureHandler() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
