[#BloombergLP-balst-StackTraceTestAllocator-failNoop]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceTestAllocator.adoc[StackTraceTestAllocator]::failNoop
:relfileprefix: ../../../
:mrdocs:

Does nothing&period; `setFailureHandler` may be called with this function, in which case this allocator object, when a failure occurs, will recover rather than abort&period; Note that in ALL failure situations, errors or warnings will be written to the `ostream` associated with this object prior to the failure handler call&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktracetestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
failNoop();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
