[#BloombergLP-balst-StackTraceFrame-2constructor-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame]::StackTraceFrame
:relfileprefix: ../../../
:mrdocs:

Create a local time descriptor object having the specified `address`, `libraryFileName`, `lineNumber`, `mangledSymbolName`, `offsetFromSymbol`, `sourceFileName`, and `symbolName` attribute values&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `&hyphen;1 &lt;&equals; lineNumber`&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
StackTraceFrame(
    void const* address,
    std::string&lowbar;view const& libraryFileName,
    int lineNumber,
    std::string&lowbar;view const& mangledSymbolName,
    std::size&lowbar;t offsetFromSymbol,
    std::string&lowbar;view const& sourceFileName,
    std::string&lowbar;view const& symbolName,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
