[#BloombergLP-balst-StackTraceFrame-2constructor-0b9]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame]::StackTraceFrame
:relfileprefix: ../../../
:mrdocs:

Create a `StackTraceFrame` object having the (default) attribute values&colon; &grave; address &equals;&equals; 0 libraryFileName &equals;&equals; &quot;&quot; lineNumber &equals;&equals; &hyphen;1 mangledSymbolName &equals;&equals; &quot;&quot; offsetFromSymbol &equals;&equals; (size&lowbar;t)&hyphen;1 sourceFileName &equals;&equals; &quot;&quot; symbolName &equals;&equals; &quot;&quot; &grave; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
StackTraceFrame(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
