[#BloombergLP-balst-StackTraceFrame-2constructor-0b5]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame]::StackTraceFrame
:relfileprefix: ../../../
:mrdocs:

Constructors

== Synopses

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

Create a `StackTraceFrame` object having the (default) attribute values&colon; &grave; address &equals;&equals; 0 libraryFileName &equals;&equals; &quot;&quot; lineNumber &equals;&equals; &hyphen;1 mangledSymbolName &equals;&equals; &quot;&quot; offsetFromSymbol &equals;&equals; (size&lowbar;t)&hyphen;1 sourceFileName &equals;&equals; &quot;&quot; symbolName &equals;&equals; &quot;&quot; &grave; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
xref:BloombergLP/balst/StackTraceFrame/2constructor-0b9.adoc[StackTraceFrame](xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/balst/StackTraceFrame/2constructor-0b9.adoc[_» more&period;&period;&period;_]#

Create a `StackTraceFrame` object having the same value as the specified `original` object&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balst/StackTraceFrame/2constructor-03.adoc[StackTraceFrame](
    xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/balst/StackTraceFrame/2constructor-03.adoc[_» more&period;&period;&period;_]#

Create a local time descriptor object having the specified `address`, `libraryFileName`, `lineNumber`, `mangledSymbolName`, `offsetFromSymbol`, `sourceFileName`, and `symbolName` attribute values&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; The behavior is undefined unless `&hyphen;1 &lt;&equals; lineNumber`&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balst/StackTraceFrame/2constructor-0f.adoc[StackTraceFrame](
    void const* address,
    std::string&lowbar;view const& libraryFileName,
    int lineNumber,
    std::string&lowbar;view const& mangledSymbolName,
    std::size&lowbar;t offsetFromSymbol,
    std::string&lowbar;view const& sourceFileName,
    std::string&lowbar;view const& symbolName,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/balst/StackTraceFrame/2constructor-0f.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
