[#BloombergLP-balst-StackTraceFrame-2constructor-03]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame]::StackTraceFrame
:relfileprefix: ../../../
:mrdocs:

Create a `StackTraceFrame` object having the same value as the specified `original` object&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
StackTraceFrame(
    xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
