[#BloombergLP-balst-StackTraceConfigurationUtil]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::StackTraceConfigurationUtil
:relfileprefix: ../../
:mrdocs:

This `struct` provides a namespace for functions that configure the behavior of stack traces performed by `balst`&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceconfigurationutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct StackTraceConfigurationUtil;
----

== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/balst/StackTraceConfigurationUtil/disableResolution.adoc[`disableResolution`] 
| Disable symbol, source file name, and line number resolution in stack traces performed by `balst`&period; Note that such resolution is expensive, involving disk access, and on Windows platforms has thread&hyphen;safety concerns if the application is using `dbghelp&period;dll`&period; Disabling resolution allows an application owner to globally prevent any resolution of symbols (by `balst`) in the process&period;
| xref:BloombergLP/balst/StackTraceConfigurationUtil/enableResolution.adoc[`enableResolution`] 
| Enable symbol resolution and source file name &amp; line number resolution on platforms that support them in stack traces performed by `balst`&period; Note that such resolution is expensive, involving disk access, and on Windows platforms has thread&hyphen;safety concerns if the application is using `dbghelp&period;dll`&period; Enabling resolution (the default state) results in `balst` stack traces giving as much information as is available on the platform&period;
| xref:BloombergLP/balst/StackTraceConfigurationUtil/isResolutionDisabled.adoc[`isResolutionDisabled`] 
| Return whether symbol and line number resolution in stack traces is disabled&period; Note that if neither `disableResolution` nor `enableResolution` have ever been called, this defaults to `false`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
