[#BloombergLP-balst-StackTrace-2constructor-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTrace.adoc[StackTrace]::StackTrace
:relfileprefix: ../../../
:mrdocs:

Create an empty `StackTrace` object (having a length of 0)&period; Optionally specify `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, then an owned heap&hyphen;bypass allocator object is used&period; Note that the heap&hyphen;bypass allocator is used by default to avoid heap allocation in situations where the heap may have been corrupted&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktrace&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
StackTrace(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
