[#BloombergLP-balm-operator_not_eq-0d]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` samples do not have the same value, and `false` otherwise&period; Two samples do not have the same value if they have different values for their timestamps, or number of record groups, or if any of the groups of records at corresponding indices have different values&period;

== Synopsis

Declared in `&lt;balm&lowbar;metricsample&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balm/MetricSample.adoc[MetricSample] const& lhs,
    xref:BloombergLP/balm/MetricSample.adoc[MetricSample] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
