[#BloombergLP-balm-operator_not_eq-0c]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` integer metrics do not have the same value and `false` otherwise&period; Two integer metrics do not have the same value if they record measurements using different integer collector objects or if one, but not both, have a null collector (i&period;e&period;, `collector()` is 0)&period;

== Synopsis

Declared in `&lt;balm&lowbar;integermetric&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balm/IntegerMetric.adoc[IntegerMetric] const& lhs,
    xref:BloombergLP/balm/IntegerMetric.adoc[IntegerMetric] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
