[#BloombergLP-balm-operator_not_eq-06]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` metric records do not have the same value and `false` otherwise&period; Two records do not have same value if they differ in their respective values for `metricId`, `count`, `total`, `min`, or `max` attributes&period;

== Synopsis

Declared in `&lt;balm&lowbar;metricrecord&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balm/MetricRecord.adoc[MetricRecord] const& lhs,
    xref:BloombergLP/balm/MetricRecord.adoc[MetricRecord] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
