[#BloombergLP-balm-IntegerCollector-load]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/IntegerCollector.adoc[IntegerCollector]::load
:relfileprefix: ../../../
:mrdocs:

Load into the specified `record` the id of the metric being collected, as well as the current count, total, minimum, and maximum aggregated values for the metric&period; Note that `k&lowbar;DEFAULT&lowbar;MIN !&equals; MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MIN` and `k&lowbar;DEFAULT&lowbar;MAX !&equals; MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MAX`&semi; when populating `record`, this operation will convert default values for minimum and maximum&period; A minimum value of `k&lowbar;DEFAULT&lowbar;MIN` will populate a minimum value of `MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MIN` and a maximum value of `k&lowbar;DEFAULT&lowbar;MAX` will populate a maximum value of `MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MAX`&period;

== Synopsis

Declared in `&lt;balm&lowbar;integercollector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
load(xref:BloombergLP/balm/MetricRecord.adoc[MetricRecord]* record) const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
