[#BloombergLP-balm-DefaultMetricsManagerScopedGuard-2destructor]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/DefaultMetricsManagerScopedGuard.adoc[DefaultMetricsManagerScopedGuard]::&#126;DefaultMetricsManagerScopedGuard
:relfileprefix: ../../../
:mrdocs:

Destroy this scoped guard which invokes `DefaultMetricsManager&colon;&colon;destroy()`&period; The behavior is undefined if the default instance of the metrics manager is externally destroyed prior to this destructor being invoked&period;

== Synopsis

Declared in `&lt;balm&lowbar;defaultmetricsmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&#126;DefaultMetricsManagerScopedGuard();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
