[#BloombergLP-balm-DefaultMetricsManager-destroy]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/DefaultMetricsManager.adoc[DefaultMetricsManager]::destroy
:relfileprefix: ../../../
:mrdocs:

Destroy the default instance of `MetricsManager`&period; After this method returns, `instance()` will return 0&period; The behavior is undefined if `instance()` is 0 or if this method is called from one thread while another thread is accessing the default metrics manager instance (i&period;e&period;, this method is _not_ thread&hyphen;safe)&period;

== Synopsis

Declared in `&lt;balm&lowbar;defaultmetricsmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
destroy();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
