[#BloombergLP-balm-Collector-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/Collector.adoc[Collector]::reset
:relfileprefix: ../../../
:mrdocs:

Reset the count, total, minimum, and maximum values of the metric being collected to their default states&period; After this operation, the count and total values will be 0, the minimum value will be `MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MIN`, and the maximum value will be `MetricRecord&colon;&colon;k&lowbar;DEFAULT&lowbar;MAX`&period;

== Synopsis

Declared in `&lt;balm&lowbar;collector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
