[#BloombergLP-ball-LoggerManagerDefaults-areValidDefaultThresholdLevels]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerDefaults.adoc[LoggerManagerDefaults]::areValidDefaultThresholdLevels
:relfileprefix: ../../../
:mrdocs:

Return `true` if each of the specified `recordLevel`, `passLevel`, `triggerLevel`, and `triggerAllLevel` values is a valid default severity threshold level attributes, and `false` otherwise&period; Valid severity threshold level values are in the range `&lsqb;0 &period;&period; 255&rsqb;`&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerdefaults&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
areValidDefaultThresholdLevels(
    int recordLevel,
    int passLevel,
    int triggerLevel,
    int triggerAllLevel);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
