[#BloombergLP-ball-LoggerManagerConfiguration-setDefaultThresholdLevelsCallback]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::setDefaultThresholdLevelsCallback
:relfileprefix: ../../../
:mrdocs:

Set the default thresholds callback functor attribute of this object to the specified `thresholdsCb`&period; Note that this method cannot fail, and that `thresholdsCb` can be a &quot;null&quot; (i&period;e&period;, unpopulated) functor object&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setDefaultThresholdLevelsCallback(xref:BloombergLP/ball/LoggerManagerConfiguration/DefaultThresholdLevelsCallback-05.adoc[DefaultThresholdLevelsCallback] const& thresholdsCb);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
