[#BloombergLP-ball-LoggerManagerConfiguration-isValidDefaultRecordBufferSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::isValidDefaultRecordBufferSize
:relfileprefix: ../../../
:mrdocs:

Return `true` if the specified `numBytes` is a valid default&hyphen;logger record&hyphen;buffer size value, and `false` otherwise&period; `numBytes` is valid if `0 &lt; numBytes`&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
isValidDefaultRecordBufferSize(int numBytes);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
