[#BloombergLP-ball-LoggerManagerConfiguration-defaultPassLevel]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::defaultPassLevel
:relfileprefix: ../../../
:mrdocs:

Return the default Pass threshold level attribute of the `LoggerManagerDefaults` attribute of this object&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
defaultPassLevel() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
