[#BloombergLP-ball-LoggerManager-shutDownSingleton]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManager.adoc[LoggerManager]::shutDownSingleton
:relfileprefix: ../../../
:mrdocs:

Destroy the logger manager singleton and release all resources used by it&period; This method has no effect if the logger manager singleton does not exist (i&period;e&period;, it has not been initialized or has already been destroyed)&period; The behavior is undefined if this method is called from one thread while another thread is accessing the logger manager singleton (i&period;e&period;, this method is _not_ thread&hyphen;safe)&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
shutDownSingleton();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
