[#BloombergLP-ball-LoggerManager-2constructor]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManager.adoc[LoggerManager]::LoggerManager
:relfileprefix: ../../../
:mrdocs:

Create a logger manager having the specified `configuration` of defaults and attributes&period; Optionally specify a `globalAllocator` used to supply memory&period; If `globalAllocator` is 0, the currently installed global allocator is used&period; Note that the new logger manager is _not_ the singleton logger manager used by macros of the BALL logging framework&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
LoggerManager(
    xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration] const& configuration,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* globalAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
