[#BloombergLP-ball-AsyncFileObserver-stdoutThreshold]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/AsyncFileObserver.adoc[AsyncFileObserver]::stdoutThreshold
:relfileprefix: ../../../
:mrdocs:

Return the minimum severity of records that will be logged to `stdout` by this async file observer&period; Note that records with a threshold less severe than `stdoutThreshold()` may still be output to the log file if file logging is enabled&period;

== Synopsis

Declared in `&lt;ball&lowbar;asyncfileobserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/ball/Severity/Level.adoc[Severity::Level]
stdoutThreshold() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
