[#BloombergLP-baljsn-EncoderTestAddress-2constructor-02]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/baljsn.adoc[baljsn]::xref:BloombergLP/baljsn/EncoderTestAddress.adoc[EncoderTestAddress]::EncoderTestAddress
:relfileprefix: ../../../
:mrdocs:

Constructors

== Synopses

Declared in `&lt;baljsn&lowbar;encoder&lowbar;testtypes&period;h&gt;`

Create an object of type &apos;EncoderTestAddress&apos; having the value of the specified &apos;original&apos; object&period; After performing this action, the &apos;original&apos; object will be left in a valid, but unspecified state&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-0c.adoc[EncoderTestAddress](xref:BloombergLP/baljsn/EncoderTestAddress.adoc[EncoderTestAddress]&& original) noexcept;
----

[.small]#xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-0c.adoc[_» more&period;&period;&period;_]#

Create an object of type &apos;EncoderTestAddress&apos; having the default value&period; Use the optionally specified &apos;basicAllocator&apos; to supply memory&period; If &apos;basicAllocator&apos; is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-08.adoc[EncoderTestAddress](xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-08.adoc[_» more&period;&period;&period;_]#

Create an object of type &apos;EncoderTestAddress&apos; having the value of the specified &apos;original&apos; object&period; Use the optionally specified &apos;basicAllocator&apos; to supply memory&period; If &apos;basicAllocator&apos; is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-0f.adoc[EncoderTestAddress](
    xref:BloombergLP/baljsn/EncoderTestAddress.adoc[EncoderTestAddress] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-0f.adoc[_» more&period;&period;&period;_]#

Create an object of type &apos;EncoderTestAddress&apos; having the value of the specified &apos;original&apos; object&period; After performing this action, the &apos;original&apos; object will be left in a valid, but unspecified state&period; Use the optionally specified &apos;basicAllocator&apos; to supply memory&period; If &apos;basicAllocator&apos; is 0, the currently installed default allocator is used&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-07.adoc[EncoderTestAddress](
    xref:BloombergLP/baljsn/EncoderTestAddress.adoc[EncoderTestAddress]&& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator);
----

[.small]#xref:BloombergLP/baljsn/EncoderTestAddress/2constructor-07.adoc[_» more&period;&period;&period;_]#


[.small]#Created with https://www.mrdocs.com[MrDocs]#
