[#BloombergLP-balcl-operator_not_eq-01]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balcl.adoc[balcl]::operator!&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` do not have the same value, and `false` otherwise&period; Two objects of type `OccurrenceInfo` do not have the same value if and only if they have different occurrence types, or exactly one has a default value, or else both have a default value but their respective default values have either different types or different values&period;

== Synopsis

Declared in `&lt;balcl&lowbar;occurrenceinfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator!&equals;(
    xref:BloombergLP/balcl/OccurrenceInfo.adoc[OccurrenceInfo] const& lhs,
    xref:BloombergLP/balcl/OccurrenceInfo.adoc[OccurrenceInfo] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
