[#BloombergLP-balcl-operator_eq-07]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balcl.adoc[balcl]::operator&equals;&equals;
:relfileprefix: ../../
:mrdocs:

Return `true` if the specified `lhs` and `rhs` have the same value, and `false` otherwise&period; Two `TypeInfo` objects have the same value if their associated options have the same type, both objects do not have a linked variable or both refer to the same variable, and both do not have a constraint or both refer to the same constraint&period; Note that two objects constructed from copies of the same constraint will _not_ be identical&period; (Use `constraint`&sol;`setConstraint` to ensure that both constraints are the same&period;)

== Synopsis

Declared in `&lt;balcl&lowbar;typeinfo&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
operator&equals;&equals;(
    xref:BloombergLP/balcl/TypeInfo.adoc[TypeInfo] const& lhs,
    xref:BloombergLP/balcl/TypeInfo.adoc[TypeInfo] const& rhs);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
