[#BloombergLP-balb-Sequence6-2constructor-06]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/Sequence6.adoc[Sequence6]::Sequence6
:relfileprefix: ../../../
:mrdocs:

Create an object of type `Sequence6` having the default value&period; Use the optionally specified `basicAllocator` to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;balb&lowbar;testmessages&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
Sequence6(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
