[#BloombergLP-balb-Sequence1-2constructor-01]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/Sequence1.adoc[Sequence1]::Sequence1
:relfileprefix: ../../../
:mrdocs:

Create an object of type `Sequence1` having the value of the specified `original` object&period; Use the optionally specified `basicAllocator` to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Synopsis

Declared in `&lt;balb&lowbar;testmessages&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
Sequence1(
    xref:BloombergLP/balb/Sequence1.adoc[Sequence1] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
