[#BloombergLP-balb-PipeTaskManager-2constructor-02]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PipeTaskManager.adoc[PipeTaskManager]::PipeTaskManager
:relfileprefix: ../../../
:mrdocs:

Create a task manager having no message handlers&period; Optionally specify a `basicAllocator` used to supply memory&period; If `basicAllocator` is 0, the currently installed default allocator is used&period; Message handlers can be supplied using the return value of the `controlManager` method&period; If that return value is used to create other `PipeTaskManager` objects, this object (the owner of the internal `ControlManager` must outlive those other objects&period; The `start` method must be called successfully before messages will be received (on a separate thread created by `start`)&period; Note that the name of the message pipe is supplied as an argument to `start`&period;

== Synopsis

Declared in `&lt;balb&lowbar;pipetaskmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
PipeTaskManager(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
