[#BloombergLP-balb-PipeControlChannel-shutdown]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PipeControlChannel.adoc[PipeControlChannel]::shutdown
:relfileprefix: ../../../
:mrdocs:

Stop reading from the pipe and dispatching messages&period; If the background thread has begun processing a message, this method will block until a message that is currently being processed completes&period;

== Synopsis

Declared in `&lt;balb&lowbar;pipecontrolchannel&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
shutdown();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
