[#BloombergLP-balb-PerformanceMonitor-Statistics-elapsedTime]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/PerformanceMonitor.adoc[PerformanceMonitor]::xref:BloombergLP/balb/PerformanceMonitor/Statistics.adoc[Statistics]::elapsedTime
:relfileprefix: ../../../../
:mrdocs:

Return the number of seconds (in wall time) that have elapsed since the startup the process identified by the result of the `pid()` function&period;

== Synopsis

Declared in `&lt;balb&lowbar;performancemonitor&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
double
elapsedTime() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
