[#BloombergLP-balb-ControlManager-printUsage]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/ControlManager.adoc[ControlManager]::printUsage
:relfileprefix: ../../../
:mrdocs:

Print to the specified `stream` the specified `preamble` text, followed by the registered commands and documentation for this control manager&period; Note that a newline is appended to `preamble` in the output&period;

== Synopsis

Declared in `&lt;balb&lowbar;controlmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
printUsage(
    std::ostream& stream,
    std::string&lowbar;view const& preamble) const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
