[#BloombergLP-balb-ControlManager-allocator]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balb.adoc[balb]::xref:BloombergLP/balb/ControlManager.adoc[ControlManager]::allocator
:relfileprefix: ../../../
:mrdocs:

Return the allocator used by this object to supply memory&period; Note that if no allocator was supplied at construction the default allocator in effect at construction is used&period;

== Synopsis

Declared in `&lt;balb&lowbar;controlmanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]*
allocator() const;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
