:relfileprefix: ../../../
[#boost-urls-url_view-max_size]

== xref:boost.adoc[pass:[boost]]::xref:boost/urls.adoc[pass:[urls]]::xref:boost/urls/url_view.adoc[pass:[url_view]]::max_size


Return the maximum number of characters possible


=== Synopsis

Declared in header `<https://www.github.com/boostorg/url/blob/develop/include/boost/url/url_view.hpp#L331[boost/url/url_view.hpp,window=blank_]>`

[source,cpp,subs="verbatim,macros,-callouts"]
----
constexpr
static
std::size_t
max_size() noexcept;
----

=== Description


This represents the largest number of
characters that are possible in a url,
not including any null terminator.

=== Constant.

=== Throws nothing.








