:relfileprefix: ../../../
[#boost-urls-error-no_space]

== xref:boost.adoc[pass:[boost]]::xref:boost/urls.adoc[pass:[urls]]::xref:boost/urls/error.adoc[pass:[error]]::no_space


No space in output buffer


=== Synopsis

Declared in header `<https://www.github.com/boostorg/url/blob/develop/include/boost/url/error.hpp#L77[boost/url/error.hpp,window=blank_]>`

[source,cpp,subs="verbatim,macros,-callouts"]
----
no_space
----

=== Description


This error is returned when a provided
output buffer was too small to hold
the complete result of an algorithm.



