[#ossl_param_st-data]
= xref:ossl_param_st.adoc[ossl&lowbar;param&lowbar;st]::data
:relfileprefix: ../
:mrdocs:

Pointer to the parameter value buffer (input when setting, output when requesting)&period;

== Synopsis

Declared in `&lt;openssl&sol;core&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void* data;
----

== Description

Organization of the bytes depends on `data&lowbar;type&period;` For PTR types this holds a pointer to the actual data rather than the data itself&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
