[#SSL_get_recv_max_early_data]
= SSL&lowbar;get&lowbar;recv&lowbar;max&lowbar;early&lowbar;data
:mrdocs:

Return the recv&lowbar;max&lowbar;early&lowbar;data limit configured on an SSL connection&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
uint32&lowbar;t
SSL&lowbar;get&lowbar;recv&lowbar;max&lowbar;early&lowbar;data(xref:SSL.adoc[SSL] const* s);
----

== Return Value

Current recv&lowbar;max&lowbar;early&lowbar;data value in bytes&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| SSL connection to query&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
