[#SSL_get_default_timeout]
= SSL&lowbar;get&lowbar;default&lowbar;timeout
:mrdocs:

Return the default session timeout for the protocol negotiated on a connection&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
long
SSL&lowbar;get&lowbar;default&lowbar;timeout(xref:SSL.adoc[SSL] const* s);
----

== Return Value

Default timeout in seconds assigned to new SSL&lowbar;SESSION objects for that protocol&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| SSL connection whose protocol determines the default timeout&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
