[#SSL_get_accept_stream_queue_len]
= SSL&lowbar;get&lowbar;accept&lowbar;stream&lowbar;queue&lowbar;len
:mrdocs:

Return how many incoming QUIC streams are waiting to be accepted&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t
SSL&lowbar;get&lowbar;accept&lowbar;stream&lowbar;queue&lowbar;len(xref:SSL.adoc[SSL]* s);
----

== Return Value

Number of remotely initiated streams currently queued for SSL&lowbar;accept&lowbar;stream()&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| QUIC connection SSL object&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
