[#SSL_clear]
= SSL&lowbar;clear
:mrdocs:

Reset an SSL object so it can be reused for another connection&period;

== Synopsis

Declared in `&lt;openssl&sol;ssl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
SSL&lowbar;clear(xref:SSL.adoc[SSL]* s);
----

== Return Value

1 on success, or 0 on failure (including QUIC SSL objects)&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| SSL connection to clear&semi; method, ciphers, and BIOs are retained&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
